static-property Random _random = 0x17a87c;
static-method float random() = 0x777a4;

static-method float sin(float x) = 0x7775c;
static-method float cos(float x) = 0x77728;
static-method float abs(float x) = 0x7781c;
static-method float min(float a, float b) = 0x7782c;
